SCHEDULE 4 CONFORMITY ASSESSMENT PROCEDURES
(This Schedule substantially reproduces the provisions of Part 1 of Annex IV of the Transportable Pressure Equipment Directive.)

5 Module B—EC type-examination
Where the type satisfies the relevant provisions of Part IV of these Regulations, the notified body must issue an EC type-examination certificate to the applicant. The certificate, which should be valid for ten years and be renewable, must contain the name and address of the manufacturer, the conclusions of the examination and the necessary data for identification of the approved type.
A list of the relevant parts of the technical documentation must be annexed to the certificate and a copy kept by the notified body.
If the notified body refuses to issue an EC type-examination certificate to the manufacturer or to his authorised representative established within the Community, that body must provide detailed reasons for such refusal. Provision must be made for an appeals procedure.