6 Amendment of Schedule 1 to the principal Regulations
For Schedule 1 to the principal Regulations there shall be substituted the following —

“SCHEDULE 1 CHARGES FOR FABRIC SUPPORTS AND WIGS
Column(1) Specified Appliance	Column (2) Specified Charge
Surgical Brassiere	£22.30
Abdominal or Spinal Support	£33.75
Stock Modacrylic Wig	£55.10
Partial Human Hair Wig	£145.55
Full Bespoke Human Hair Wig	£212.85”