2 Amendment of the Measuring Equipment (Liquid Fuel and Lubricants) Regulations (Northern Ireland) 1998
The Measuring Equipment (Liquid Fuel and Lubricants) Regulations (Northern Ireland) 1998 shall be amended as provided in regulations 3 to 11.
S.R. 1998 No. 113 as amended by S.R. 2002 No. 71 and S.R. 2003 No. 422