5 Fees payable for medical surveillance by an employment medical adviser under the Ionising Radiations Regulations (Northern Ireland) 2000
1 Fees shall be payable in accordance with paragraphs (2) and (3) by an employer to the Executive in respect of medical surveillance of any of his employees by an employment medical adviser for the purposes of the Ionising Radiations Regulations (Northern Ireland) 2000.
S.R. 2000 No. 375, amended by S.R. 2001 No. 436; revoked in part by S.R. 2003 No. 510 and S.R. 2003 No. 533
2 Subject to paragraph (3), where the medical surveillance includes an examination of, or interview with, the employee, the fee shall be a basic fee for each examination or interview or combination thereof of £60 together with an additional fee of £61 in respect of all X-rays taken, and £36 in respect of all laboratory tests carried out, in connection with any one such examination or interview or combination thereof.
3 Where the medical surveillance is confined to an examination of, and making of entries in, records, the fee shall be £32.