SCHEDULE NET ANNUAL VALUE OF TRANSMISSION AND DISTRIBUTION HEREDITAMENTS OCCUPIED BY THE COMPANY
Articles 6 to 9
1	2
Hereditaments	Specified Amounts
Part A Hereditaments occupied by the Company for the transmission and distribution of electricity other than the Moyle Interconnector.	£22,500,000
Part B The Moyle Interconnector	£750,000