1 Citation, commencement and interpretation
1 This Order may be cited as the M1/A1 (Sprucefield Interchange) Order (Northern Ireland) 2003 and shall come into operation on 11th April 2003.
2 In this Order “the Contractor” means The Sprucefield Centre Limited whose registered office is situated at 298 Upper Newtownards Road, Belfast BT4 3EJ.
3 In this Order “the map” means the drawing numbered 5148.00/0125 marked “Ml/A1 (Sprucefield Interchange) Order (Northern Ireland) 2003” copies of which have been deposited at the Department’s Roads Service offices, Headquarters, Room 2-01, Clarence Court, 10-18 Adelaide Street, Belfast BT2 8GB and Eastern Division, Hydebank, 4 Hospital Road, Belfast BT8 8JL.