SCHEDULE 8 Containment measures
Part II

Table 2: Containment measures for activities involving genetic modification of micro-organisms in premises other than those referred to in Tables 1a, 1b and 1c
21 Inactivation of GMMs in contaminated material and waste including those in process effluent before final discharge