2 Declaration of controlled area
It is hereby declared that Northern Ireland continues to be a controlled area for the purposes of Article 29(1) of the Foot-and-Mouth Disease Order (Northern Ireland) 1962 and the provisions of that Order shall have effect accordingly subject to the variations, and disapplied to the extent, set out in the Schedule.