SCHEDULE 4 Purpose and contents of safety reports

Part I Purpose of Safety Reports
3 demonstrating that adequate safety and reliability have been incorporated into the—
(a) design and construction, and
(b) operation and maintenance,
of any installation and equipment and infrastructure connected with its operation which are linked to major accident hazards within the establishment;