3 Amendment of the General Regulations
In regulation 4(2) of the General Regulations (amount of a Sure Start Maternity Grant), in each place where “£200” appears there shall be substituted “£300”.
Paragraph (2) was substituted by regulation 3(b) of S.R. 1992 No. 394 and sub-paragraph (d) was added by S.R. 1997 No. 155 and amended by S.R. 2000 No. 49