Schedule 3 Symbols for Units of Measurement which may be used for Trade
regulation 10
(1)	(2)
Unit of Measurement	Symbol
metre	m
centimetre	cm
millimetre	mm
square metre	m2
square decimetre	dm2
square centimetre	cm2
cubic metre	m3
cubic centimetre	cm3
litre	l or L
decilitre	dl or dL
centilitre	cl or cL
millilitre	ml or mL
tonne	t
kilogram	kg
hectogram	hg
gram	g
milligram	mg