Part II General

19 Isolation from sources of energy
1 Every employer shall ensure that where appropriate work equipment is provided with suitable means to isolate it from all its sources of energy.
2 Without prejudice to the generality of paragraph (1), the means mentioned in that paragraph shall not be suitable unless they are clearly identifiable and readily accessible.
3 Every employer shall take appropriate measures to ensure that re-connection of any energy source to work equipment does not expose any person using the work equipment to any risk to his health or safety.