5 Revocation
The Motor Cycles (Protective Headgear) Regulations (Northern Ireland) 1981 and the Motor Cycles (Protective Headgear) (Amendment) Regulations (Northern Ireland) 1986 are hereby revoked.
S.R. 1981 No. 141
S.R. 1986 No. 238