1999 No. 126
HEALTH AND SAFETY
Pressure Vessels (Verification) (Amendment) Regulations (Northern Ireland) 1999
Made 16th March 1999
Coming into operation 1st April 1999

The Department of Economic Development, being a Department designated for the purposes of section 2(2) of the European Communities Act 1972 in relation to the regulation of the design, construction, verification and inspection of pressure vessels, in exercise of the powers conferred on it by that section, and of every other power enabling it in that behalf, hereby makes the following Regulations:
S.I. 1977/1718
1972 c. 68