SCHEDULE Application Information
5 A description of the meter, stating—
(i) whether the meter is single or polyphase;
(ii) whether it is an induction or electronic meter;
(iii) whether it is a prepayment or credit meter; and
(vi) if it contains more than one register, the number of registers it contains.