7 Advertisements on hoardings relating to building operations
In Part I of Schedule 3, in Class 8—
(a) in paragraph (b) of the Class 8 conditions for “28 days” substitute “13 weeks”;
(b) in paragraph (c) of the Class 8 conditions for “6.1 metres long” substitute “12.1 metres long”; and
(c) in paragraph (e) of the Class 8 conditions for “2 years” substitute “3 years”.