SCHEDULE 3 Fees payable for medical surveillance by an employment medical adviser under the Control of Lead at Work Regulations (Northern Ireland) 1986
Regulation 6
Column 1	Column 2
Item	Fee
(a) On the first assessment of an employee (including any clinical medical examination and laboratory tests in connection with the assessment).	£47
(b) On each subsequent assessment of an employee— (i) for laboratory tests where these are carried out	£28
(ii) for a clinical medical examination where this is carried out	£29