SCHEDULE 8 Module: Conformity to type
2 The manufacturer shall take all measures necessary to ensure that the manufacturing process assures compliance of the manufactured equipment or protective systems with the type as described in the EC type-examination certificate and with the relevant requirements of the ATEX Directive.