SCHEDULE 8 Module: Conformity to type
1 This module describes that part of the procedure whereby the manufacturer or his authorised representative established in the Community ensures and declares that the equipment in question is in conformity with the type as described in the EC type-examination certificate and satisfies the requirements of the ATEX Directive applicable to it. The manufacturer or his authorised representative established in the Community shall affix the CE marking to each piece of equipment and draw up a written declaration of conformity.