SCHEDULE 2 Essential health and safety requirements relating to the design and construction of equipment and protective systems intended for use in potentially explosive atmospheres

1.3.1 Hazards arising from different ignition sources
Potential ignition sources such as sparks, flames, electric arcs, high surface temperatures, acoustic energy, optical radiation, electromagnetic waves and other ignition sources must not occur.