SCHEDULE 2 Essential health and safety requirements relating to the design and construction of equipment and protective systems intended for use in potentially explosive atmospheres

1.1.2 Selection of materials
Within the limits of the operating conditions laid down by the manufacturer, it must not be possible for a reaction to take place between the materials used and the constituents of the potentially explosive atmosphere which could impair explosion protection.