SCHEDULE 2 Essential health and safety requirements relating to the design and construction of equipment and protective systems intended for use in potentially explosive atmospheres

1.1.1 Selection of materials
The materials used for the construction of equipment and protective systems must not trigger off an explosion, taking into account foreseeable operational stresses.