SCHEDULE 10 Module: Internal control of production
1 This module describes the procedure whereby the manufacturer or his authorised representative established in the Community, who carries out the obligations laid down in paragraph 2, ensures and declares that the equipment satisfies the requirements of the ATEX Directive applicable to it. The manufacturer or his authorised representative established in the Community shall affix the CE marking to each piece of equipment and draw up a written declaration of conformity.