SCHEDULE 1 Additional requirements

67 Noise and vibration of plant
(1) Measures shall be taken to ensure that the exposure of a person on an installation to a risk to his health or safety from noise or vibration of plant shall be prevented or, where that is not reasonably practicable, adequately controlled.
(2) The measures required by sub-paragraph (1) shall, so far as is reasonably practicable, be measures other than the provision of personal protective equipment.