SCHEDULE 3 LIMITS OF VARIATION

PART D — VITAMINS AND TRACE ELEMENTS
Analytical constituents	Limits of variation (absolute value in percentage by weight, except where otherwise specified)
Cobalt	± 50% of the amount stated
Copper	±30% of the amount stated for declarations above 200 mg/kg ±50% of the amount stated for declarations up to and including 200 mg/kg
Iodine	±50% of the amount stated
Iron	±30% of the amount stated for declarations of 250 mg/kg or more ±50% of the amount stated for declarations less than 250 mg/kg
Manganese	±50% of the amount stated
Molybdenum	±50% of the amount stated
Selenium	±50% of the amount stated
Vitamms D2, and D3	±30% of the amount stated for declarations above 4000 IU/kg ±50% of the amount stated for declarations up to and including 4000 IU/kg
Vitamins other than D2 and D3	In case of deficiency— 30% of the amount stated
Zinc	±50% of the amount stated