SCHEDULE 10 PERMITTED FEEDING STUFFS INTENDED FOR PARTICULAR NUTRITIONAL PURPOSES AND PROVISIONS RELATING TO THEIR USE
CHAPTER B 7 The recommended period of use indicated in column 5 of Chapter A indicates a range within which the nutritional purpose should normally be achieved. Manufacturers may refer to more precise periods of use, within the permitted range.