6 Earnings limit
The sums specified in paragraph 2B of Schedule 2 to the Social Security Benefit (Dependency) Regulations (Northern Ireland) 1977 (prescribed circumstances for increase of an invalid care allowance) shall be increased from £115, £15 and £115 to £120, £16 and £120 respectively.
S.R. 1977 No. 74; relevant amending regulations are S.R. 1984 No. 382 and S.R. 1992 No. 112