SCHEDULE 8 Additional conditions that apply to the keeping of pigs

PART 4 SOWS AND GILTS

29 Group housing
The pen where the group is kept shall have sides greater than 2.8 metres in length, except when there are less than 6 individuals in the group, when the sides of the pen shall be no less than 2.4 metres in length.