Defective Premises (Landlord’s Liability) Act (Northern Ireland) 2001
2001 Chapter 10
An Act to amend the law as to the liability of landlords for injury or damage caused to persons through defects in the state of premises let under certain tenancies.
[2nd July 2001]

BE IT ENACTED by being passed by the Northern Ireland Assembly and assented to by Her Majesty as follows: