ANNEX III NOTIFICATION OF END OF CONSULTATIONS FOLLOWING THE OBJECTION PROCEDURE

5. Product Specification and single document
5.2 The single document has been amended:
… Yes** … No
** If ‘Yes’, annex a copy of the updated document