PART TWO OWN FUNDS

TITLE I ELEMENTS OF OWN FUNDS

CHAPTER 2 Common Equity Tier 1 capital

Section 3 Deductions from Common Equity Tier 1 items, exemptions and alternatives

Sub-Section 1 Deductions from Common Equity Tier 1 items

Article 46 Deduction of holdings of Common Equity Tier 1 instruments where an institution does not have a significant investment in a financial sector entity
1 For the purposes of point (h) of Article 36(1), institutions shall calculate the applicable amount to be deducted by multiplying the amount referred to in point (a) of this paragraph by the factor derived from the calculation referred to in point (b) of this paragraph:
(a) the aggregate amount by which the direct, indirect and synthetic holdings by the institution of the Common Equity Tier 1, Additional Tier 1 and Tier 2 instruments of financial sector entities in which the institution does not have a significant investment exceeds 10 % of the aggregate amount of Common Equity Tier 1 items of the institution calculated after applying the following to Common Equity Tier 1 items:
(i) Articles 32 to 35;
(ii) the deductions referred to in points (a) to (g), points (k)(ii) to (v) and point (l) of Article 36(1), excluding the amount to be deducted for deferred tax assets that rely on future profitability and arise from temporary differences;
(iii) Articles 44 and 45;
(b) the amount of direct, indirect and synthetic holdings by the institution of the Common Equity Tier 1 instruments of those financial sector entities in which the institution does not have a significant investment divided by the aggregate amount of direct, indirect and synthetic holdings by the institution of the Common Equity Tier 1, Additional Tier 1 and Tier 2 instruments of those financial sector entities.
2 Institutions shall exclude underwriting positions held for five working days or fewer from the amount referred to in point (a) of paragraph 1 and from the calculation of the factor referred to in point (b) of paragraph 1.
3 The amount to be deducted pursuant to paragraph 1 shall be apportioned across all Common Equity Tier 1 instruments held. Institutions shall determine the amount of each Common Equity Tier 1 instrument that is deducted pursuant to paragraph 1 by multiplying the amount specified in point (a) of this paragraph by the proportion specified in point (b) of this paragraph:
(a) the amount of holdings required to be deducted pursuant to paragraph 1;
(b) the proportion of the aggregate amount of direct, indirect and synthetic holdings by the institution of the Common Equity Tier 1 instruments of financial sector entities in which the institution does not have a significant investment represented by each Common Equity Tier 1 instrument held.
4 The amount of holdings referred to in point (h) of Article 36(1) that is equal to or less than 10 % of the Common Equity Tier 1 items of the institution after applying the provisions laid down in points (a)(i) to (iii) of paragraph 1 shall not be deducted and shall be subject to the applicable risk weights in accordance with Chapter 2 or 3 of Title II of Part Three and the requirements laid down in Title IV of Part Three, as applicable.
5 Institutions shall determine the amount of each Common Equity Tier 1 instrument that is risk weighted pursuant to paragraph 4 by multiplying the amount specified in point (a) of this paragraph by the amount specified in point (b) of this paragraph:
(a) the amount of holdings required to be risk weighted pursuant to paragraph 4;
(b) the proportion resulting from the calculation in point (b) of paragraph 3.
Substituted by Corrigendum to Regulation (EU) No 575/2013 of the European Parliament and of the Council of 26 June 2013 on prudential requirements for credit institutions and investment firms and amending Regulation (EU) No 648/2012 (OJ L 176, 27.6.2013, p. 1).