ANNEX XII DESCRIPTION OF MANAGEMENT AND CONTROL SYSTEMS UNDER ARTICLE 71 OF REGULATION (EC) No 1198/2006 AND ARTICLE 47 OF THE PRESENT REGULATION

PART A Model description of management and control systems

3. INTERMEDIATE BODIES
NB: This section must be completed separately for each intermediate body. Indicate the authority which has delegated the function to the intermediate bodies.