Article 1a . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Directive 2007/42/EC of 29 June 2007 relating to materials and articles made of regenerated cellulose film intended to come into contact with foodstuffs (Text with EEA relevance) (Codified version).