ANNEX II REQUIREMENTS RELATING TO THE EEC COMPONENT TYPE-APPROVAL OF SPRAY-SUPPRESSION DEVICES
Appendix 1

Tests on spray-suppression devices of the energy-absorber type

5. Results

5.2. If within a series of five tests the highest and lowest percentages of water collected depart from the average percentage by more than 5 %, the series of five tests must be repeated.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Regulation (EC) No 661/2009 of the European Parliament and of the Council of 13 July 2009 concerning type-approval requirements for the general safety of motor vehicles, their trailers and systems, components and separate technical units intended therefor (Text with EEA relevance).