CHAPTER I Scope, placing on the market and free movement
Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2009/105/EC of the European Parliament and of the Council of 16 September 2009 relating to simple pressure vessels (codified version) (Text with EEA relevance).

CHAPTER II Certification procedures
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EC type-examination
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EC verification
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EC declaration of conformity
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER III CE marking
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER IV Final provisions
Article 17 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 18 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 19 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .