Council Directive
of 26 July 1971
on the approximation of the laws of the Member States relating to common provisions for both measuring instruments and methods of metrological control
(71/316/EEC) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2009/34/EC of the European Parliament and of the Council of 23 April 2009 relating to common provisions for both measuring instruments and methods of metrological control (Recast) (Text with EEA relevance).