ANNEX

EU ECOLABEL CRITERIA

1. TEXTILE FIBRE CRITERIA

Criterion 6. Polyamide (or nylon)
6(b) Production standard 2: N2O emissions from monomer production.
The emissions to air of N2O from nylon monomer production, expressed as an annual average, shall not exceed 9,0 g N2O/kg of caprolactam (for nylon 6) or adipic acid (for nylon 6,6).

Assessment and verification
the applicant shall provide documentation or test reports showing compliance based on monitoring data, together with a declaration of compliance from fibre manufacturer(s) and their feedstock providers.