ANNEX SIRENE MANUAL

1. THE SCHENGEN INFORMATION SYSTEM (SIS) AND THE NATIONAL SIRENE BUREAUX

1.4. Staff

1.4.2. Training

European level
Common training courses shall be organised at least once a year, to enhance cooperation between SIRENE bureaux by allowing staff to meet colleagues from other SIRENE bureaux, to share information on national working methods and to create a consistent and equivalent level of knowledge. Furthermore, these will make staff aware of the importance of their work and the need for mutual solidarity in view of the common security of Member States.