ANNEX

TABLE OF REDUCTIONS
Delay	Total expenditure in FY2004(EUR)	Use of 4 % reserve	Amount subject to reduction(EUR)	Red. Rate(%)	Reduction computation(EUR)
0 months	32 367 673,72	n.a.	n.a.	0	0,0
Up to 1 month	7 283 177,62	-1 294 706,95	5 988 470,67	10	598 847,07
Up to 2 months	1 601 753,18	0,0	1 601 753,18	25	400 438,29
Up to 3 months	601 262,42	0,0	601 262,42	45	270 568,09
Up to 4 months	484 224,09	0,0	484 224,09	70	338 956,86
5 and more months	926 475,69	0,0	926 475,69	100	926 475,69
Grand Total	43 264 566,71	-1 294 706,95	9 602 186,04		2 535 286,0