ANNEX

(f) Information required under Annex II to the Cartagena Protocol on Biosafety to the Convention on Biological Diversity:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Implementing Decision (EU) 2016/87 of 22 January 2016 on the withdrawal from the market of existing products derived from MON 863 (MON-ØØ863-5) and repealing Decisions 2010/139/EU, 2010/140/EU, 2010/141/EU authorising the placing on the market of products containing, consisting of, or produced from genetically modified maize MON863×MON810×NK603 (MON-ØØ863-5×MON-ØØ81Ø-6×MON-ØØ6Ø3-6), MON863×MON810 (MON-ØØ863-5×MON-ØØ81Ø-6) and MON863×NK603 (MON-ØØ863-5×MON-ØØ6Ø3-6) pursuant to Regulation (EC) No 1829/2003 of the European Parliament and of the Council (notified under document C(2016) 204) (Text with EEA relevance).