ANNEX

DRAFT DECISION
of […]
of the management entities under the Agreement between the Government of the United States of America and the European Community on the coordination of energy-efficiency labelling programmes for office equipment on the revision of the computer monitor specifications in Annex C, part II, to the Agreement
THE MANAGEMENT ENTITIES,
Having regard to the Agreement between the Government of the United States and the European Community on the coordination of energy-efficiency labelling programmes for office equipment, and in particular Article XII thereof,
Whereas the computer monitor specifications in Annex C, part II, effective since 1 January 2006, should be repealed and replaced by revised specifications,
HAVE DECIDED AS FOLLOWS:
For computer monitors with diagonal screen sizes below 30 inches, the computer monitor specifications in Annex C, part II, to the Agreement are repealed and replaced by the specifications in the Annex to this Decision with effect from 30 October 2009.
For computer monitors with diagonal screen sizes from 30 to 60 inches, inclusive, the computer monitor specifications in Annex C, part II, to the Agreement are repealed and replaced by the specifications in the Annex to this Decision with effect from 30 January 2010.
The Decision, done in duplicate, shall be signed by the Co-chairs.
Signed in Washington DC, […]
[…]
on behalf of the United States Environmental Protection Agency
Signed in Brussels, […]
[…]
on behalf of the European Community