Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by 2011/120/EU: Commission Decision of 21 February 2011 concerning the non-inclusion of methyl bromide in Annex I to Council Directive 91/414/EEC (notified under document C(2011) 950) Text with EEA relevance.