Article 3 During the period 1 January to 31 December 2008 the following rules shall apply:
1. The allocation of essential medical use quotas for chlorofluorocarbons 11, 12, 113, 114 and 115 shall be to the companies indicated in Annex II.
2. The allocation of essential laboratory use quotas for chlorofluorocarbons 11, 12, 113, 114 and 115 and other fully halogenated chlorofluorocarbons shall be to the companies indicated in Annex III.
3. The allocation of essential laboratory use quotas for halons shall be to the companies indicated in Annex IV.
4. The allocation of essential laboratory use quotas for carbon tetrachloride shall be to the companies indicated in Annex V.
5. The allocation of essential laboratory use quotas for 1,1,1-trichloroethane shall be to the companies indicated in Annex VI.
6. The allocation of laboratory and analytical critical use quotas for methyl bromide shall be to the companies indicated in Annex VII.
7. The allocation of essential laboratory use quotas for hydrobromofluorocarbons shall be to the companies indicated in Annex VIII.
8. The allocation of essential laboratory use quotas for bromochloromethane shall be to the companies indicated in Annex IX.
9. The essential use quotas for chlorofluorocarbons 11, 12, 113, 114 and 115, other fully halogenated chlorofluorocarbons, carbon tetrachloride, 1,1,1-trichloroethane, hydrobromofluorocarbons and bromochloromethane shall be as set out in Annex X.