ANNEX

1. Frequency bands and systems allowed for MCA Services
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Prevention of connection of mobile terminals to ground networks
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Technical parameters
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(a) Equivalent isotropic radiated power (e.i.r.p.), outside the aircraft, from the NCU/aircraft BTS/aircraft Node B
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(b) Equivalent isotropic radiated power (e.i.r.p.), outside the aircraft, from the on-board terminal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(c) Operational requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (31.12.2020) by The Radio Spectrum (EU Exit) Regulations 2018 (S.I. 2018/1385), reg. 1, Sch. 2 para. 10; 2020 c. 1, Sch. 5 para. 1(1)