Article 1 1 This Decision shall apply to terminal equipment intended to be connected to a public telecommunications network and falling within the scope of the harmonised standard referred to in Article 2(1).
2 This Decision establishes a common technical regulation covering the telephony application requirements for terminal equipment for the pan-European cellular digital land-based mobile telecommunications network comprising constant envelope modulation and operating in the 1800 MHz band with a channel separation of 200 kHz and carrying traffic channels according to the TDMA principle. The Decision shall also apply to terminal equipment capable of operation in both 900 and 1800 MHz bands.