ANEX II

IV. DETERMINATION OF TOTAL NITROGEN CONTENT

8. EXPRESSION OF RESULTS

8.2. Precision
8.2.1. Repeatability (r): 0,007 g per 100 g.
8.2.2. Reproducibility (R): 0,015 g per 100 g.