The Act ceased to have effect as from 1st August 1970, except in so far as the Schedule is required for the purposes of the definition of licensed bank in section 22(1) of the Prevention of Fraud (Investments) Act (NI) 1940 (see s.7(2) Finance Act (NI) 1970)